Next frame temporary saves (incl. caller-save registers) local variables

callee-save registers

caller’s %ebp return address static link first parameter . last parameter Previous frame Callee’s %ebp points to where caller’s %ebp is saved.

Callee’s static link points to where static link is saved in the appropriate frame.